V = VALID I = INVALID

In my opinion this test been conducted in a manner in accordance with Test Method D6082 and the appropriate amendments through the information letter system. The remarks included in this report describe the anomalies associated with this test.

Date Completed: EOT Time: Oil Code:

Testing Laboratory

Signature

Typed Name

Title

SUBMITTED BY:

Test Number

CONDUCTED FOR

Alternate Codes:

Instrument ID: Test Run Number:

TEST REPORT COVER

ASTM TEST METHOD D6082 HIGH TEMPERATURE FOAMING CHARACTERISTICS OF LUBRICATING OILS

NR = Non Reference Oil Test RO = Reference Oil Test

VERSION 20020311 BETA

TSTSPON1 TSTSPON2

LABVALID

TSTOIL

ALTCODE1 ALTCODE2 ALTCODE3

OPVALID

SUBLAB

SUBSIGIM

SUBNAME

SUBTITLE

INSTRUID RUNNUM

DTCOMP EOTTIME OILCODE

OPERATIONAL PARAMETERS

Diffuser Pore Size, �m:

TEST RESULTS Foam Tendency:

Volume of Static Foam Immediately Before Air Disconnect, ml:

Diffuser Permeability, ml/min:

Foam Stability:

Volume of Static Foam One Minute After Air Disconnect, ml:

Bath Temperature, ‡C:

Air Flow, ml/min:

Device Used to Measure Air Flow:

Type of Bath (Air, Oil):

A

Model of Foam Bath:

ASTM TEST METHOD D6082 HIGH TEMPERATURE FOAMING CHARACTERISTICS OF LUBRICATING OILS FORM 2

Blender Calibration, rpm: Barometric Pressure , mm Hg:

RESULT SUMMARY

A

Not required to report (for information only).

Make of Foam Bath:

Was the Blending Option used (Y/N)?:

TMC Reference Oil ID:

Date Completed: Time Completed:

Oil Code:

Instrument ID: Test Run No.:

Date of Last TMC Calibration: TMC Calibration Expiration Date:

Lab Sample Code:

Testing Lab:

MAKEFOAM MODLFOAM

BATHTYPE BOPTION TSTTEMP BLENDCAL BAROPRES DIFPORE AIRFLOW DIFPERM DEVICEAF

FTIBD

FS1MAD

OILCODE LABOCODE

LAB IND DTCOMP EOTTIME

INSTRUID RUNNUM DTLSTCAL DTCALEXP

COMMENTS

ASTM TEST METHOD D6082 HIGH TEMERATURE FOAMING CHARACTERISTICS OF LUBRICATING OILS FORM 3 COMMENTS

Number of Comment Lines

OUT-OF-LIMIT DATA AND TIME, TEST MODIFICATIONS AND COMMENTS

TMC Reference Oil ID:

Date Completed: Time Completed:

Oil Code:

Instrument ID: Test Run No.:

Date of Last TMC Calibration: TMC Calibration Expiration Date:

Lab Sample Code:

Testing Lab:

TOTCOM OCOMR001

OILCODE LABOCODE

LAB IND DTCOMP EOTTIME

INSTRUID RUNNUM DTLSTCAL DTCALEXP