Testing Laboratory

Signature

Typed Name

Title

CONDUCTED FOR

SUBMITTED BY:

TEST METHOD D5133 Gelation Index and Gelation Temperature Test VERSION

V = VALID I = INVALID

In my opinion this test been conducted in a manner in accordance with the Test Method D6335 and the appropriate amendments through the information letter system. The remarks included in this report describe the anomalies associated with this test.

Date Completed: EOT Time: Oil Code:

Test Number

Alternate Codes:

Instrument ID: Test Run Number:

NR = Non Reference Oil Test RO = Reference Oil Test

20020204 BETA

20,000

10,000

40,000

30,000

5,000

Gelation Temperature, ‡C: Gelation Index:

TEST METHOD D5133 Gelation Index and Gelation Temperature Test FORM 2

Viscosity (cp) Temperature (‡C)

TMC Reference Oil ID:

Date Completed: Time Completed:

Oil Code:

Instrument ID: Test Run No.:

Date of Last TMC Calibration: TMC Calibration Expiration Date:

Lab Sample Code:

Testing Lab:

Number of Comment Lines

OUT-OF-LIMIT DATA AND TIME, TEST MODIFICATIONS AND COMMENTS

TEST METHOD D5133 Gelation Index and Gelation Temperature Test FORM 3 COMMENTS

TMC Reference Oil ID:

Date Completed: Time Completed:

Oil Code:

Instrument ID: Test Run No.:

Date of Last TMC Calibration: TMC Calibration Expiration Date:

Lab Sample Code:

Testing Lab: