VERSION

Signature

Testing Laboratory

Stand Test Number

In my opinion this test been conducted in a valid manner in accordance with the latest draft of Sequence IIIF procedure and the appropriate amendments through the information letter system. The remarks included in the report describe the anomalies associated with this test.

Oil Code

SUBMITTED BY:

Formulation/Stand Code

Alternate Codes

N = RESULTS CANNOT BE INTERPRETED AS REPRESENTATIVE OF OIL PERFORMANCE (NON-REFERENCE OIL) AND SHALL NOT BE USED FOR MULTIPLE TEST ACCEPTANCE

Test Stand

Typed Name

CONDUCTED FOR

Test Number

EOT Date EOT Time

Title

REPORT ON SEQUENCE IIIF EVALUATION

I = INVALID

V = VALID

Lab Test Number

RO = Reference Oil Test

NR = Non-Reference Oil Test

IIIF VERSION 20010913