CONDUCTED FOR

I =INVALID

V =VALID

End of Test

Test Number

Date Completed Fuel Batch

Oil Code Formulation/Stand Code Alternate Codes

Test Stand: No. Tests Since Last Stand Calibration Test:

Lab Engine No.

Laboratory Run Number:

NR = Non-reference Oil Test

SEQUENCE IVA VALVE TRAIN WEAR EVALUATION FINAL REPORT COVER SHEET

Total Runs on Cylinder Head

SUBMITTED BY:

Lab Head Number Lab Cam Number

RO = Reference Oil Test

Testing Laboratory

Typed Name

Title

Signature

In my opinion this test been conducted in a valid manner in accordance with the ASTM Research Report RR-D2-XXXX and the appropriate amendments through the Information Letter system. The remarks included in the report describe the anomalies associated with this test.

VERSION IVA VERSION 20010418